DROP TABLE IF EXISTS test;

CREATE TABLE IF NOT EXISTS test (
    id INT(6) UNSIGNED AUTO_INCREMENT PRIMARY KEY
) ENGINE=InnoDB DEFAULT CHARSET=utf8;
